% A test file for input of 8-bit characters.

\input 8bitdefs.tex

\nopagenumbers
\parindent=0pt

Compare the DVI output with the source file.

\bigskip

% See the table in Inside Mac vol 1, page 247.

����������������\par
����������������\par
�������������$�$��\par
$����$�$������$��$�$��\par
��$��x$�$����$�������\par
������$��$��������\par
����������������\par
����������������\par

\bigskip

prot�g� r�le na�ve �sop �vres fran�ais

\bye
